0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

ICI,sec

Average number of ICI

Accumulative histogram: ICI over all lunar phases